en	Reporting

en	Debugging/Logging

en	Storage PID: Enter default page uid for storing imported records.

en	Log storage PID: Enter page uid for storing log entries (default is 0).

en	Force time limit (seconds): Change the maximun execution time for the import process. Defaut time limit is used if value = -1. See the manual for more details.

en	Email for reporting (multiple addresses separated by comma): When the import is executed automatically, you may receive a report about the execution if you set an email address (leave blank for no report).

en	Subject of email report: Set a subject for the email report. Additional information will be appended to that subject (i.e. "Full synchronization" ou "Synchronization of table x, index y").

en	Preview/Debug limit: The number of rows to show while doing a preview. Set to 0 for showing all. This also affects the debugging output.

en	Debug: Check to turn on debugging (output depends on TYPO3 version and context; check the documentation).

en	Disable logging: Check to disable logging by TCEmain. Recommended if you don't need to keep close track of the import process.

en	All

en	Groups

en	Configurations

en	Table

en	Index

en	Priority

en	No connector defined. Cannot synchronize.

en	No service available

en	There was an error requesting the given connector service (%s). Reason: %s, code: %d.

en	The requested connector service (%s) is not available.

en	No general configuration could be found for table "%1$s" and index "%2$s". Import was aborted.

en	No column configuration could be found for table "%1$s" and index "%2$s". Import was aborted.

en	The configuration contains at least one error. Import was aborted. Use the "Data Import" module to check the configuration.

en	User %1$s doesn't have enough rights for synchronizing table %2$s.

en	Type of import data (array or xml) was not defined.

en	Data could not be fetched (connector service not available)

en	Data could not be fetched (connector error: %1$s (%2$d))

en	Data could not be fetched (connector error: %s)

en	%d new record(s) inserted

en	%d existing record(s) updated

en	%d existing record(s) deleted

en	%d existing record(s) moved

en	%s mm-relationships created

en	Synchronising all tables

en	Synchronisation of table %s

en	Update failed:

en	Insert failed:

en	Delete failed:

en	Invalid user function %s

en	Evaluation of expression %1$s failed, value was considered empty (Message: %2$s, code: %3$d).

en	Record transformation failed. See attached data for details.

en	Record transformation failed (Message: %s, code: %d). See attached data for details.

en	Empty value detected on row %1$d for column %2$s. The whole record was removed.

en	Invalid record detected and removed (Message: %s, code: %d). See attached data for details.

en	Unknown transformation property %s

en	PHP limit maximum execution time forced

en	The number of records (%1$d) is below the required limit (%2$d).

en	The import was aborted. Please see the relevant messages.

en	One or more errors were reported. The count of operations performed may not be correct.

en	An exception occurred while saving the data: %1$s (code: %2$d, location: %3$s at line %4$d)

en	External import

en	This task can be used to set up automated executions of external imports, be it for all tables in one go or for a single table.

en	Synchronization of table %1$s, index %2$d

en	Item to synchronize

en	Storage page (overrides TCA and extension setting)

en	Warnings

en	Errors

en	Success messages

en	No warnings

en	No errors

en	No success messages

en	All tables

en	Group: %s

en	Table: %1$s, index: %2$s, priority: %3$s

en	Override storage pid: %d

en	A problem occurred. The following error was returned: %1$s (Exception code: %2$d).

en	Class %s does not implement the \Cobweb\ExternalImport\DataHandlerInterface interface.

en	Could not instantiate class %s as a custom data handler.

en	The requested configuration was not found (table: %1$s, index: %2$s). Message: %3$s [%4$d]

en	An error occurred. The process was interrupted. Message: %1$s [%2$d]

en	The requested preview step (%s) was not found among the current process steps. Process was aborted.

en	External Import: Backend module permissions

en	Run synchronizations

en	Allow user to run manual synchronizations from the Backend module.

en	Define Scheduler tasks

en	Allow the user to create, modify and delete Scheduler tasks in the Backend module.

en	... when an External Import run is completed