en	No URI has been defined for the JSON data.

en	JSON data %1$s could not be fetched with error: %2$s

en	The "headers" parameter must be an array. It will be ignored.

en	The "queryParameters" parameter must be an array. It will be ignored.

en	The "useragent" parameter is not used anymore. Use the "headers" parameter instead.

en	The "accept" parameter is not used anymore. Use the "headers" parameter instead.