en	Tables with synchronization

en	Tables without synchronization

en	Below is the list of all tables using external data as defined in the TCA. From here you can manually synchronize any table. Note that you should synchronize tables with high priority (lower number) first, since lower priority tables probably depend on them.

en	Non-synchronizable tables

en	The tables listed below receive data from external sources, but do not fetch it directly. They cannot be synchronized from this BE module. They are listed here for information.

en	External information

en	There are currently no matching configurations.

en	Search

en	View details

en	View log

en	Configuration details for table "%1$s" (index: %2$s)

en	Run preview for table "%1$s" (index: %2$s)

en	Choose process step to preview

en	Download

en	Preview

en	Preview data

en	Preview data for step %s

en	Run

en	Back to list

en	Table

en	Description

en	Priority

en	Connector

en	Connector details

en	Group

en	Data type

en	Custom data handler

en	Reference node

en	Reference XPath

en	Array path

en	Array path separator

en	Namespaces

en	External primary key

en	Storage page

en	Jump to page

en	Additional fields

en	Additional fields are merged with the column configuration

en	Enforce PID

en	Disable logging

en	SQL restriction

en	Clear cache

en	Alternate column index

en	Specific columns order

en	Custom process steps

en	Update slug fields

en	(Not defined)

en	Additional fields

en	Disabled operations

en	None

en	Minimum number of records

en	General information

en	Columns mapping

en	Process steps

en	The import process will go through the following steps:

en	Default step

en	Custom step

en	Legend

en	Invalid steps

en	The following custom steps are registered with errors. They are not part of the import process. Check the "General information" tab for details.

en	Synchronize

en	Automatic synchronization

en	Full automation of synchronization

en	It is possible to enable the automatic synchronization of all tables with an external synchronization configuration. Configurations will be handled in order of decreasing priority. It is currently not activated.

en	A Scheduler task exists for the automatic synchronization of all tables but it has been disabled. Only an administrator can enable it again.

en	The automatic synchronization of all tables is activated (frequency: %1$s). The next run will take place on %2$s.

en	Start date

en	(leave empty for immediate activation; format: yyyy-mm-dd hh:mm:ss)

en	Frequency

en	(use cron-like syntax or simply enter a number of seconds)

en	Task group

en	Set synchronisation

en	Table: %1$s (%2$s), index: %3$s

en	For all configurations

en	The automatic synchronization information has been saved.

en	The automatic synchronization information could not be saved (%1$s).

en	The automatic synchronization is not yet enabled.

en	A Scheduler task exists but has been disabled. Only an administrator can enable it again.

en	Automated group imports cannot be edited here.

en	Activated (frequency: %1$s). The next run will take place on %2$s.

en	The chosen task was not found.

en	The form contains invalid input. Please correct the data in the highlighted fields.

en	The frequency should either be a cron command or a number of seconds larger than 0.

en	The frequency may not be empty.

en	The frequency should either be a cron command or a number of seconds larger than 0 (error: %s).

en	The given start date is not valid.

en	Add synchronization settings

en	Edit synchronization settings

en	Synchronization settings

en	Remove the automated synchronization settings

en	Please confirm

en	Are you sure you want to remove this automatic synchronisation?

en	The automatic synchronisation was successfully canceled.

en	The automatic synchronisation could not be canceled.

en	%d seconds

en	Remove

en	Cancel

en	There were actually %d messages, but only the first five are displayed here. Please check your logs for more information.

en	No column is defined for this configuration.

en	The "scheduler" extension is not loaded.

en	Creating or updating the task has failed (I know this is not very helpful, sorry).

en	Migration required

en	The general configuration must be placed in <code>$TCA[table-name]['external']['general']</code> and not in <code>$TCA[table-name]['ctrl']['external']</code> anymore. Support will be discontinued in the future. Please adapt your TCA.

en	Log entries

en	Status

en	Run date

en	User

en	Configuration

en	Context

en	Message

en	Duration